{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"RAKTJ","type":"number","width":11,"decimals":0},{"name":"CIM","type":"character","width":50},{"name":"SZERZ","type":"character","width":40},{"name":"PELD","type":"number","width":4,"decimals":0}],"n_rows":4,"rows_kept":4,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
[3000,"Adatb zis-kezel\u0082s a gyakorlatban.","Quittner P l",1]
[5000,"Adatb zisrendszerek. Alapvet\u0082s.","Ullmann, J.D. - Widom, J.",1]
[2000,"Sz m¡t stechnika rendszerszervez\u008bknek.","Quittner P l",5]
[1000,"Olvas¢i \u0082lm\u0082nyeim.","Kuk P l",1]